Host-to-Adapter Guide for Xylogics Micro-Annex, Bay Networks 2000, and Nortel 2000 console servers

Database revised: 7/7/2008 23:39
Doc built: 7/8/2008 9:46

This guide is an addition to my Console Wiring Guides and other console information, located at:
http://www.conserver.com/consoles/.

The adapters listed on the Host-to-Console Adapter Pages can be purchased from APA Cables and Networks (1-800-422-2537, for approximately 8.50 (as of May, 2007). Steve Vacik has been helpful in the past. (svacik@apacn.com)

This document lists devices by vendor and model, and then lists the connector type on the device, followed by which adapter to use to connect the device to a micro-annex (et.al.) Console Server Port.

The information below originally supported the Xylogics Micro-Annex products. However, Bay Networks bought the product line, and renamed it the Bay 2000. Later, Nortel Networks bought Bay, renamed the line the Nortel 2000, but then killed the product. (All of these products used the same RJ-45 wiring pinouts, and so they can use the same adapters.)

If you use these Console Servers with with SUN servers, you should read the information on our BREAK Testing pages:
http://www.conserver.com/consoles/

3-Com Core Builder 7000 'Control'
fdce91 AMDTE91
3-Com Core Builder 7000 'Service'
fdce91 AMDTE91
3-Com CoreBuilder 9000 3SB9EME console
mdte92 AFDCE92
3-Com CoreBuilder 9000 3SB9EME modem
mdte92 AFDCE92
3-Com Dual Speed Hub 500
mdte92 AFDCE92
3-Com ESPL 330 Remote Office console
mdte91 AFDCE91
3-Com ESPL 330 Remote Office RS-232
fdte AMDCE
3-Com Hub 8/TPM
mdte92 AFDCE92
3-Com Link Switch 1000
mdte92 AFDCE92
3-Com LinkBuilder FDDI Mgmt Mod.
mdte91 AFDCE91
3-Com NetBuilder 3800 (3c16910)
mdte92 AFDCE92
3-Com NetBuilder Remote Office RS-232
fdte AMDCE
3-Com SuperStack (3C16980A)
mdte92 AFDCE92
3-Com SuperStack (3C16985A)
mdte92 AFDCE92
3-Com Superstack II 3300 (M/MM/XM)
mdte92 AFDCE92
3-Com SuperStack II Enterprise Mon
mdte91 AFDCE91
3-Com SuperStack II NetBuilder RS-232
fdte AMDCE
3-Com SuperStack II VPN Builder
mdte91 AFDCE91
3-Com SuperStack NetBuilder console
mdte91 AFDCE91
3-Com/Palm Palm Cradle
fdce91 AMDTE91
3-Com/USR Courier modems
fmodem AMMOD
3-COM/USR Courier, Sportster modems
fmodem AMMOD
3-Com/USR Total Control Chassis
frjUSR annex-usr
3-Com/USR Total Control CMTS Mod
frjUSR annex-usr
3-Com/USR Total Control Dual 10/100
frjUSR annex-usr
3-Com/USR Total Control NMC
frjUSR annex-usr
Accelerated Networks AN-30 'console'
fdte91 AMDCE91
ACT Networks ADM 8300 NetPerformer console
mdce91 AFDTE91
ACT Networks ADM 8300 ports 1-3
fdte AMDCE
Acterna DTS-300 MPEG Analyzer
mdte92 AFDCE92
ActiveScan AS300 console
mdte92 AFDCE92
Adaptec FS4500 storage device
fsmj AFDCE92
Adaptec ISA1500 storage device
mdte92 AFDCE92
ADC CUDA 12000 'COM 1'
mdte92 AFDCE92
ADC CUDA 12000 'COM 2'
frjCiscoC ciscoc-annex
Addtron Hub
mdte AFDCE
ADI MX 4P multi-channel IRD
fdce91 AMDTE91
ADIC Scalar 100 Tape Library
mdce91 AFDTE91
ADIC Scalar 218M Tape Unit
fdce91 AMDTE91
ADIC Scalar SC24 Tape Unit
fdce AMDTE
AdTran BCU 'Admin' port
fdce91 AMDTE91
Adtran DSU III AR Primary EIA232
fdce AMDTE
Adtran DSU III AR Secondary EIA232
fdce AMDTE
Adtran Smart 16e Shelf Controller
fdce AMDTE
AEA PK-80 Terminal Node Ctrlr
fdce AMDTE
Airespace 4102
mdte91 AFDCE91
Alcatel 7300 DSLAM AACU-C card 'Craft'
fdce92 AMDTE92
Alcatel 7300 DSLAM on-board 'Craft'
mdte91 AFDCE91
Allied Telesyn AT-RMON 'Terminal Port'
fdce91 AMDTE91
Allied Telesyn AT-TS90TR 'Terminal Port'
fdce91 AMDTE91
Allied Telesyn CentreCom 3624TR 'RS-232'
fdce91 AMDTE91
Alpha Telecom 6016A 'CONSOLE'
fdce91 AMDTE91
Altega VPN Concentrator
frjCiscoC ciscoc-annex
Alteon ACE Switch 110
fdce91 AMDTE91
Alteon Networks a708 load balancer
fdce91 AMDTE91
Alteon Networks ACE Director 180e, 184
fdce91 AMDTE91
Alteon Networks ACE Director 2 and 3
fdce91 AMDTE91
APC Smart-UPS 10000, 1400
fdce92 AMDTE92
APC Smart-UPS 1400-XL, 2200
fdce92 AMDTE92
APC Smart-UPS 3300
fdce92 AMDTE92
APC MasterSwitch Console
mdte92 AFDCE92
Apere IMAG
mdte92 AFDCE92
Apex Outlook K/V/M
fdce91 AMDTE91
Apple Xserve G4
mdte92 AFDCE92
Aptix Systems Explorer, port 'P1', 'P2'
mdte92 AFDCE92
Aruba 800
frjCiscoC ciscoc-annex
ASA Computers Storage Servers
mdte92 AFDCE92
Asante Technologies Asante Hub 1012 'RS232'
fdce91 AMDTE91
Ascend ISDN TA (P-25, -50, -75)
fdce92 AMDTE92
Ascend MAX, MX-400 'control' port
fdce92 AMDTE92
Ascend Pipeline Access Router
fdce92 AMDTE92
Assured Access X1000 POP, TTY1 and 2
mdte92 AFDCE92
AstroCom NX1 'Supervisory Port'
fdce AMDTE
Astrocom SP series CSU/DSU; PPP, RS-232
fdce92 AMDTE92
Atlanta Design Labs ADL1901 GPS Timebase
fdce91 AMDTE91
Atlas MRD3187A
mdte92 AFDCE92
Aurora Networks ShoreGear-24
fdce91 AMDTE91
Automated Logic LGRM-E
mdte92 AFDCE92
Avaya P332G-ML SFP gig-E sw (EQ0246)
fdte91 AMDCE91
Avocent Autoview2000 KVM
mdte91 AFDCE91
Avocent DS1800 remote KVM
mdte92 AFDCE92
Avocent DSR2010 remote KVM
mdte92 AFDCE92
Avocent DSR4020 remote KVM
mdte92 AFDCE92
Axcent 3-Pro Integ. Access Control Frame
mdte92 AFDCE92
Axis 2400 Video Server COM ports
mdte92 AFDCE92
Baracuda Networks Spam Firewall 400
mdte92 AFDCE92
Bay Networks 100-B-T Net Mgmt Mod Console
mdce91 AFDTE91
Bay Networks 100-B-T Net Mgmt Mod RS-232
mdte AFDCE
Bay Networks BayStack 102 'Comm'
mdce91 AFDTE91
Bay Networks BayStack 350-12T 'Comm'
mdce91 AFDTE91
Bay Networks BayStack 350F-HD switch
mdce92 AFDTE91
Bay Networks BayStack 350T switch
mdce92 AFDTE91
Bay Networks BayStack Access Node console
mdce91 AFDTE91
Bay Networks BayStack Hub 'Comm'
mdce91 AFDTE91
Baydel N. America Disk Arrays
mdte AFDCE
BigBand Networks BME-50 console
mdte91 AFDCE91
BigBand Networks BMR-100, 1200 consoles
mdte92 AFDCE92
BigBand Networks BRE-20 mpeg encoder blade
fdte92 AMDCE92
BigBand Networks CUDA 12000 'COM 1'
mdte92 AFDCE92
BigBand Networks CUDA 12000 'COM 2'
frjCiscoC ciscoc-annex
BigBand Networks DSP Debug Cables
fdce91 AMDTE91
BigBand Networks SMU-1000 consoles
mdte92 AFDCE92
BlueCat Networks Adonis 500, 1000
mdte92 AFDCE92
BlueCoat Systems 400 Series FW
mdte92 AFDCE92
Brix VoIP QoS appliance
frjCiscoC ciscoc-annex
Brocade DS8B SAN Switch
mdce91 AFDTE91
Brocade Silk Worm 3800 SAN switch
mdte91 AFDCE91
Cabletron MRXI-24 CONSOLE
fdte91 AMDCE91
Cabletron SSR-8 (Smart Switch Router)
mdce91 AFDTE91
Cache Flow Cache Flow
mdte92 AFDCE92
CacheFlow CacheFlow 5000
mdte92 AFDCE92
California Digital 1420 server (PC)
mdte92 AFDCE92
Carrier Access WideBank 28
fdce92 AMDTE92
Cayman Systems Netopia 3500 DSL router
fdce91 AMDTE91
Centronics DS2800 Digital Sat. Recv.
fdte92 AMDCE92
Centronics DS3000 Digital Sat. Recv.
fdte91 AMDCE91
Centrum Communications CentrumRemote 'console'
fdce AMDTE
Checkpoint SBX-166LHGE-2
mdte92 AFDCE92
Checkpoint VPN-1 Edge console
mdte92 AFDCE92
CHIPCom ONsemble T.R. Hub 'Aux'
mdte91 AFDCE91
CHIPCom ONsemble T.R. Hub 'Console'
mdte91 AFDCE91
Cisco 10000 Perf. Routing Eng.
frjCiscoC ciscoc-annex
Cisco 1130 Wireless LAN Sol. Eng
mdte92 AFDCE92
Cisco 11500 Content Svcs Sw.
frjCiscoC ciscoc-annex
Cisco 12000 GRP-B RSP module aux
mdte AFDCE
Cisco 12000 GRP-B RSP module cons
fdce AMDTE
Cisco 1700
frjCiscoC ciscoc-annex
Cisco 1720
frjCiscoC ciscoc-annex
Cisco 1900 Switch
frjCiscoC ciscoc-annex
Cisco 1900 switch (older)
mdte92 AFDCE92
Cisco 2100
mdte92 AFDCE92
Cisco 2100 series
frjCiscoC ciscoc-annex
Cisco 2500 routers
frjCiscoC ciscoc-annex
Cisco 2524 'aux'
frjCiscoC ciscoc-annex
Cisco 2524 'console'
frjCiscoC ciscoc-annex
Cisco 2600 routers
frjCiscoC ciscoc-annex
Cisco 2800 routers
frjCiscoC ciscoc-annex
Cisco 2900 switches, incl. XL
frjCiscoC ciscoc-annex
Cisco 2926 switch Console port
fdce AMDTE
Cisco 2950 switches
frjCiscoC ciscoc-annex
Cisco 3500, 3550 switches
frjCiscoC ciscoc-annex
Cisco 3600, 3650 routers
frjCiscoC ciscoc-annex
Cisco 3660-MB-2FE 'aux'
frjCiscoC ciscoc-annex
Cisco 3660-MB-2FE 'cons'
frjCiscoC ciscoc-annex
Cisco 3700 routers
frjCiscoC ciscoc-annex
Cisco 3745 I/O-2FE module
frjCiscoC ciscoc-annex
Cisco 3750G
frjCiscoC ciscoc-annex
Cisco 4003 Supv. console
fdce AMDTE
Cisco 4900 series
frjCiscoC ciscoc-annex
Cisco 5000/5500 Supervisor console
fdce AMDTE
Cisco 5000/5500 Supv. II console
fdce AMDTE
Cisco 6400 series
frjCiscoC ciscoc-annex
Cisco 6500 series
frjCiscoC ciscoc-annex
Cisco 6500 series Supv. 1 console
frjCiscoC ciscoc-annex
Cisco 7200 I/O Controller AUX port
mdte AFDCE
Cisco 7200 I/O Controller CONSOLE port
fdce AMDTE
Cisco 7200 VXR NPE-G1
frjCiscoC ciscoc-annex
Cisco 7500 RSP4 AUX port
mdte AFDCE
Cisco 7500 RSP4 CONSOLE port
fdce AMDTE
Cisco Access 1600 series
frjCiscoC ciscoc-annex
Cisco Access 800 series
frjCiscoC ciscoc-annex
Cisco Access 804, 805, 827
frjCiscoC ciscoc-annex
Cisco Access 900 series
frjCiscoC ciscoc-annex
Cisco AS5100
frjCiscoC ciscoc-annex
Cisco AS5200
frjCiscoC ciscoc-annex
Cisco AS5300
frjCiscoC ciscoc-annex
Cisco Cache Engine 500
frjCiscoC ciscoc-annex
Cisco Catalyst 1100 Series
frjCiscoC ciscoc-annex
Cisco Catalyst 1200 Series
frjCiscoC ciscoc-annex
Cisco Catalyst 1400 Series
frjCiscoC ciscoc-annex
Cisco Catalyst 2100
mdte92 AFDCE92
Cisco Catalyst 2924 switch
frjCiscoC ciscoc-annex
Cisco Catalyst 2950 switch
frjCiscoC ciscoc-annex
Cisco Catalyst 3500XL
frjCiscoC ciscoc-annex
Cisco Catalyst 3548 switch
frjCiscoC ciscoc-annex
Cisco Catalyst 3550 switch
frjCiscoC ciscoc-annex
Cisco Catalyst 3560XL
frjCiscoC ciscoc-annex
Cisco Catalyst 3750 switch
frjCiscoC ciscoc-annex
Cisco Catalyst 4500 Series
frjCiscoC ciscoc-annex
Cisco Catalyst 4948
frjCiscoC ciscoc-annex
Cisco Catalyst 6500 SUP1A-2GE
frjCiscoC ciscoc-annex
Cisco Cisco 2005
frjCiscoC ciscoc-annex
Cisco CLEI CODE (3660 family)
frjCiscoC ciscoc-annex
Cisco Content Svcs Switch
frjCiscoC ciscoc-annex
Cisco CS-516
frjCiscoC ciscoc-annex
Cisco CSS-11555
frj45-css11500 annex-css11500
Cisco FastHub 100+
mdte92 AFDCE92
Cisco FastHub 200+
frjCiscoC ciscoc-annex
Cisco FastHub 300 console port
mdte92 AFDCE92
Cisco Local Director 430
mdte92 AFDCE92
Cisco ONS 15216 EDFA 2 'RS-232'
fdce91 AMDTE91
Cisco ONS 15454, TCC card 'CRAFT'
fdce92 AMDTE92
Cisco PIX
mdte92 AFDCE92
Cisco PIX 506e, 515, 515e, 525
frjCiscoC ciscoc-annex
Cisco Supv. engine 4 console
frjCiscoC ciscoc-annex
Cisco Supv. engine II plus
frjCiscoC ciscoc-annex
Cisco Supv. III NFFC module
frjCiscoC ciscoc-annex
Cisco UBR 904, 924
frjCiscoC ciscoc-annex
Cisco UBR-10012
frjCiscoC ciscoc-annex
Cisco UBR-7111 aux
frjCiscoC ciscoc-annex
Cisco UBR-7111 console
frjCiscoC ciscoc-annex
Cisco UBR-7114
frjCiscoC ciscoc-annex
Cisco VPN 3000 series VPNC
mdce92 AFDTE92
Cisco VPN 3002 hardware client
frjCiscoC ciscoc-annex
Cisco WS-X4103 Supervisor (ONS)
frjCiscoC ciscoc-annex
Cisco WS-X6K-SUP2-2GE
frjCiscoC ciscoc-annex
Cobalt Raq-4 server
mdte92 AFDCE92
Cobalt Systems RaQ 3
mdte92 AFDCE92
Cogent StreamCache (PC)
mdte92 AFDCE92
Com-21 MFG 'Console'
fdce91 AMDTE91
Compaq 3000 'A' port
mdte92 AFDCE92
Compaq 3000 'B' port
mdte92 AFDCE92
Compaq 5500, 6400r
mdte92 AFDCE92
Compaq AlphaServer 8200
fmmj annex-decmmj
Compaq AlphaServer DS-10
mdte92 AFDCE92
Compaq AlphaServer DS-10L
mdte92 AFDCE92
Compaq AlphaServer DS-20
mdte92 AFDCE92
Compaq ML370, ML530
mdte92 AFDCE92
Compaq ML570 'A' and 'B'
mdte91 AFDCE91
Compaq Netelligent 'Mgmt'
mdte91 AFDCE91
Compaq Proliant (PC) 1600 6/400R
mdte92 AFDCE92
Compaq Proliant (PC) 1850R
mdte92 AFDCE92
Compaq Proliant (PC) 3000 'A'
mdte92 AFDCE92
Compaq Proliant (PC) 3000 'B'
mdte92 AFDCE92
Compaq Proliant (PC) 5500
mdte92 AFDCE92
Compaq Proliant (PC) 5500R, 5600R
mdte92 AFDCE92
Compaq Proliant (PC) 6400R, 6500R
mdte92 AFDCE92
Compaq Proliant (PC) 8500
mdte92 AFDCE92
Compaq Proliant (PC) DL1850R, 3000
mdte92 AFDCE92
Compaq Proliant (PC) DL360, DL380
mdte92 AFDCE92
Compaq Proliant (PC) DL850R
mdte92 AFDCE92
Compaq Proliant (PC) ML370
mdte92 AFDCE92
Compaq Proliant (PC) ML530, ML570
mdte92 AFDCE92
Compaq SP270 '1'
mdte92 AFDCE92
Compaq SP270 '2'
mdte92 AFDCE92
Compaq SP750 '1'
mdte92 AFDCE92
Compaq SP750 '2'
mdte92 AFDCE92
ComStream CM 2000B Modulator 'Rem Ctrl' port
fdce92 AMDTE92
Concurrent MediaHawk BMS
mdte92 AFDCE92
Concurrent MediaHawk CMS II
mdte92 AFDCE92
ConSentry Networks switch
mdte92 AFDCE92
Convergent Networks ICS 2000 Media Gateway CP 5G
fdce92 AMDTE92
Convergent Networks ICS 2000 Media Gateway ISU 800M
fdce92 AMDTE92
Convergent Networks ICS 2000 Media Gateway TSP
fdce92 AMDTE92
Convergent Networks ICS 2000 Media Gateway TSU 155M
fdce92 AMDTE92
Crystal CS500 (PC) COM ports
mdte92 AFDCE92
Cybex LongView (local)
mdte92 AFDCE92
Cybex LongView (remote)
fdce92 AMDTE92
Cyclades TS-100 'RS232' port
mdte92 AFDCE92
D-Link DES-3226 managed switch
fdce92 AMDTE92
D-Link DES-3226 managed switch
fdce92 AMDTE92
Data Direct Networks S2A 8000, 'COM 2' port
fdte92 AMDCE92
Data Direct Networks SAN Appliance
fdce92 AMDTE92
Datum Inc. TymeServe 2100 'P5 SERIAL (A)'
mdte92 AFDCE92
Datum, Inc. TymeServe 2100 'P6 SERIAL (B)'
fdce91 AMDTE91
DEC Alpha Server
fmmj annex-decmmj
DEC Alpha Server 800 (5/500)
mdte92 AFDCE92
DEC Model 880WW
mdte92 AFDCE92
DEC Personal Workstation 600A
mdte92 AFDCE92
Dell 300 SC (PC)
mdte92 AFDCE92
Dell IMP
mdte91 AFDCE91
Dell OptiPlex GX110 (PC)
mdte92 AFDCE92
Dell OptiPlex GX270 (PC)
mdte92 AFDCE92
Dell OptiPlex GXi (PC)
mdte92 AFDCE92
Dell PowerConnect 3024 switch
mdte91 AFDCE91
Dell PowerConnect 3248 switch
mdte91 AFDCE91
Dell PowerConnect 3348 switch
mdte91 AFDCE91
Dell PowerConnect 3448 switch
mdte91 AFDCE91
Dell PowerConnect 5212 switch
mdte91 AFDCE91
Dell PowerConnect 5224 switch
mdte91 AFDCE91
Dell PowerEdge (PC) 1500 SC
mdte92 AFDCE92
Dell PowerEdge (PC) 1550
mdte92 AFDCE92
Dell PowerEdge (PC) 1650
mdte92 AFDCE92
Dell PowerEdge (PC) 1750
mdte92 AFDCE92
Dell PowerEdge (PC) 1850, 1850r
mdte92 AFDCE92
Dell PowerEdge (PC) 1855 blade chassis
mdte92 AFDCE92
Dell PowerEdge (PC) 1950
mdte92 AFDCE92
Dell PowerEdge (PC) 2200
mdte92 AFDCE92
Dell PowerEdge (PC) 2300, 2340
mdte92 AFDCE92
Dell PowerEdge (PC) 2450, 2550
mdte92 AFDCE92
Dell PowerEdge (PC) 2600, 2650
mdte92 AFDCE92
Dell PowerEdge (PC) 2850
mdte92 AFDCE92
Dell PowerEdge (PC) 300, 350
mdte92 AFDCE92
Dell PowerEdge (PC) 4100, 4200
mdte92 AFDCE92
Dell PowerEdge (PC) 4300, 4350
mdte92 AFDCE92
Dell PowerEdge (PC) 4400, 4600
mdte92 AFDCE92
Dell PowerEdge (PC) 600, 650
mdte92 AFDCE92
Dell PowerEdge (PC) 6100, 6200
mdte92 AFDCE92
Dell PowerEdge (PC) 6300, 6350
mdte92 AFDCE92
Dell PowerEdge (PC) 6400, 6650
mdte92 AFDCE92
Dell PowerEdge (PC) 6850
mdte92 AFDCE92
Dell PowerEdge (PC) 750
mdte92 AFDCE92
Dell PowerEdge Blade Chassis
mdte92 AFDCE92
Dell PowerVault 130T 'CSE'
mdte92 AFDCE92
Dell PowerVault 130T 'DEBUG'
mdte92 AFDCE92
Dell PowerVault 6600 (storage)
mdte92 AFDCE92
Dell Precision 530 (PC)
mdte92 AFDCE92
Dell Web-100 (PC)
mdte92 AFDCE92
Denon DN-C660 CD Player
mdce91 AFDTE91
Digi CM-series DB-25F
fdce AMDTE
Digi CM-series DB-25M
mdce AFDTE
Digi CM-series DB-25M
mmodem AFMOD
Digi CM-series DB-9F
fdce91 AMDTE91
Digi One SP (Eth to RS-232)
mdte92 AFDCE92
Digital Lightwave Power Access Agent I
mdte92 AFDCE92
Digital Link DL3100 DSU, NMS port
fdce91 AMDTE91
Digital Link DL3800 T-1 Inverse Mux 'NMS'
fdce91 AMDTE91
Digital Link Prelude Encore
fdce91 AMDTE91
DirecWay DirecWay Gateway 'SERIAL'
mdte92 AFDCE92
Divicom Electra 5022
fdte92 AMDCE92
Divicom MV-100 Encoder
fdte92 AMDCE92
Electroline EAS Control Unit IV, 'COM 3'
fdce91 AMDTE91
EMC2 DS-4100B SAN Switch
mdce91 AFDTE91
EMC2 DS16B2 SAN Switch
mdce91 AFDTE91
EMC2 MGR DS-X9530-SF1-K9
frjCiscoC ciscoc-annex
Emulex ConnectPlus RAS 'console'
fdce92 AMDTE92
Enterasys Networks ANG-3000
mdte92 AFDCE92
Enterasys Networks APS-3000
mdte92 AFDCE92
Enterasys Networks Dragon GE250 Network Sensor
frjCiscoC ciscoc-annex
Enterasys Networks DSNSA-GE250-TX
frjCiscoC ciscoc-annex
Evertz 7700 Multiframe
fdce91 AMDTE91
Evertz HD9084 HD Caption Encoder
mdte91 AFDCE91
Exabyte EXB-210 tape library
fdce91 AMDTE91
EXFO FLS-2600
mdte91 AFDCE91
Extreme Black Diamond MSM64I (50015)
mdte92 AFDCE92
Extreme Networks Summit 200-24
mdte92 AFDCE92
Extreme Networks Summit 24e3
mdte92 AFDCE92
Extreme Networks Summit 48, 48i
mdte92 AFDCE92
Extreme Networks Summit 7I console, modem
mdte92 AFDCE92
Extron System 10 Plus
fdce92 AMDTE92
F5 Networks Big-IP
mdte92 AFDCE92
Farallon Networks Starlet 12 'Terminal Port'
mdte AFDCE
Fluke Visual Uptime
mdte91 AFDCE91
FORE ASN-9000 'TTY 1'
mdte92 AFDCE92
FORE ASN-9000 'TTY 2'
mdte92 AFDCE92
FORE ASX-1000BX (SCP ASXP5 card)
mdte92 AFDCE92
FORE ASX-200BX (SCP ASXP5 card)
mdte92 AFDCE92
FORE ES-3810 NMM card, 'SER' port
mdte92 AFDCE92
FORE SCP-P5-200 card 'ser' port
mdte92 AFDCE92
Foundry Networks FastIron
mdte92 AFDCE92
Foundry Networks ServerIron
mdte92 AFDCE92
Fujitsu FLM 150, 600, 2400 'TERM'
fdce AMDTE
Fujitsu Siemens RS200 X2 (PC)
mdte91 AFDCE91
G. I. (Motorola) 4DTV Satellite Receiver
fdte92 AMDCE92
G. I. (Motorola) DCT-2000 set top box 'RS-232'
fdce91 AMDTE91
G. I. (Motorola) DCT-5000 set top box 'RS-232'
fdce91 AMDTE91
G. I. (Motorola) KLS-1000 'serial port'
mdte92 AFDCE92
G. I. (Motorola) NC-1500 console
mdte92 AFDCE92
G. I. (Motorola) OM-1000 ports 1 and 2
mdte92 AFDCE92
G. I. (Motorola) QAM Modulator D9476 'CA SYNC'
fdce92 AMDTE92
Gentner AP400
mdce91 AFDTE91
Gigabyte Technology N2 Broadband GS-SR102
mdte92 AFDCE92
Gordon Kapes System 930 configuration port
fdce AMDTE
H.P. 9000 Model A500
fdce AMDTE
H.P. 9000/A500 Management port
fdce92 AMDTE92
H.P. 9000/A500 tri-port 'CONSOLE'
mdte92 AFDCE92
H.P. 9000/A500 tri-port 'REMOTE'
mdte91 AFDCE91
H.P. 9000/A500 tri-port 'UPS'
mdte91 AFDCE91
H.P. CaLan 3010H Sweep/Ingress Analyzer
fdce91 AMDTE91
H.P. CaLan 3010R Sweep/Ingress remote
fdce91 AMDTE91
H.P. CPU Management Port on LH servers
mdte92 AFDCE92
H.P. CUBE 700/96 (tty port P1)
fdte AMDCE
H.P. CUBE 700/96 (tty port P2)
mdte92 AFDCE92
H.P. EtherTwist Hub Plus
fdte AMDCE
H.P. HP 9000 K-series Modem ports
fmodem AMMOD
H.P. HP 9100 K-series UPS port
mdte92 AFDCE92
H.P. HP AdvanceStack Hub
mdte92 AFDCE92
H.P. HP HubPlus
fdte AMDCE
H.P. HP MDP ports
fdce AMDTE
H.P. J2355A EtherTwist Hub Plus
fdce AMDTE
H.P. J2600a
mdte92 AFDCE92
H.P. J3210A Management Module
mdte91 AFDCE91
H.P. Kayak XA
mdte92 AFDCE92
H.P. LAN Probe II 'RS-232'
fdte AMDCE
H.P. NAS b3000
mdte92 AFDCE92
H.P. NetServer 1000R IO port
mdte92 AFDCE92
H.P. NetServer 1000R mgmt port
mdte92 AFDCE92
H.P. NetServer LC 2000R IO port
mdte92 AFDCE92
H.P. NetServer LC 2000R mgmt port
mdte92 AFDCE92
H.P. NetServer LH, LT 6000R IO port
mdte92 AFDCE92
H.P. NetServer LH, LT 6000R mgmt port
mdte92 AFDCE92
H.P. NetServer LH, LXE Pro (PC) 6/200
mdte92 AFDCE92
H.P. NetServer LP 3r 'mgmt' port
mdte92 AFDCE92
H.P. NetServer LP 3r, (PC) COM1, 2
mdte92 AFDCE92
H.P. NetServer LPr 'mgmt' port
mdte92 AFDCE92
H.P. NetServer LPr, (PC) COM1, 2
mdte92 AFDCE92
H.P. Pavillion 6735 desktop PC
mdte92 AFDCE92
H.P. Pavillion 6735 desktop PC
mdte92 AFDCE92
H.P. ProCurve 2424M switch
mdte92 AFDCE92
H.P. ProCurve 4000 switch
mdte92 AFDCE92
H.P. Proliant (PC) DL140
mdte92 AFDCE92
H.P. Proliant (PC) DL360
mdte92 AFDCE92
H.P. Proliant (PC) DL380, DL380G5
mdte92 AFDCE92
H.P. Proliant (PC) DL580, DL585
mdte92 AFDCE92
H.P. Proliant (PC) ML370
mdte92 AFDCE92
H.P. Proliant (PC) ML570
mdte92 AFDCE92
H.P. SureStore Tape Library
mdte92 AFDCE92
H.P. Vectra VE (PC) desktop
mdte92 AFDCE92
H.P. Vectra, C-180 Visualize, J-210
mdte92 AFDCE92
H.P. Visualize C3000, C3600 (PC)
mdte92 AFDCE92
H.P. Visualize J5000, J7000 (PC)
mdte92 AFDCE92
Harmonic Lightwave HLP 4200 Platform
fdce91 AMDTE91
Harmonic Lightwaves BSG (Broadcast Svcs Gateway)
fdce91 AMDTE91
Harmonic Lightwaves Electra 5022
fdte92 AMDCE92
Harmonic Lightwaves NSG (Narrowcast Svcs Gateway)
fdce AMDTE
Hayes SmartModem 2400
fmodem AMMOD
Hayes SmartModem 300
fmodem AMMOD
HP J1473A 4-port KVM console
fdce91 AMDTE91
HP Proliant (PC) ML370, ML570
mdte92 AFDCE92
Humax PAL Set Top Box
mdte92 AFDCE92
IBM 7011-250
mdte AFDCE
IBM 7025-F30
mdte92 AFDCE92
IBM 7025-F50
mdte92 AFDCE92
IBM 7043-150 (43P Model 150)
mdte92 AFDCE92
IBM 7044-270 (44P Model 270)
mdte92 AFDCE92
IBM eServer (PC) 326
mdte92 AFDCE92
IBM NetFinity 4500r, 5000
mdte92 AFDCE92
IBM NetFinity 5600 'A', 'B'
mdte92 AFDCE92
IBM NetVista (PC) COM port
mdte92 AFDCE92
IBM PS/2 S1 and S2
mdte AFDCE
IBM x-3650 series
mdte92 AFDCE92
IBM xSeries (PC) 305, 306
mdte92 AFDCE92
IBM xSeries (PC) 336, 345
mdte92 AFDCE92
IneoQuest IQ TECH Singulus dvb analyz
mdte91 AFDCE91
Inlet Technologies Encoder
mdte91 AFDCE91
Intel iPivot servers
mdte92 AFDCE92
Internet Photonics LightStack MX55 Gig-E switch
fdce91 AMDTE91
iPlanet GSW-601S Ethernet Switch
mdce91 AFDTE91
IronPort C150 Email Security App.
mdte92 AFDCE92
Ixia Ixia 400 stress tester
mdte92 AFDCE92
Juniper IDP 200
mdte92 AFDCE92
Juniper NetScreen-208 'CONSOLE'
frjCiscoC ciscoc-annex
Juniper NetScreen-208 'MODEM'
frjCiscoC ciscoc-annex
Juniper NetScreen-SA 1000
mdte92 AFDCE92
Juniper SSG520M 'CONSOLE'
frjCiscoC ciscoc-annex
Juniper Networks ERX310, SRP-SE I/O 'RS-232'
mdte92 AFDCE92
Juniper Networks M5 Router 'conosle'
mdte92 AFDCE92
Juniper Networks M5 Router 'modem/aux'
mdte92 AFDCE92
Juniper Networks NetScreen-100 'console'
fdce AMDTE
Juniper Networks NetScreen-1000 'console'
fdce AMDTE
Juniper Networks NetScreen-25 'console', 'modem'
frjCiscoC ciscoc-annex
Juniper Networks NetScreen-50 'console'
frjCiscoC ciscoc-annex
Juniper Networks NetScreen-5GT-01 'console'
fdce91 AMDTE91
Juniper Networks NetScreen-5xp 'console'
fdce91 AMDTE91
JVC DVD-RAM Jukebox Libraries
mdte92 AFDCE92
Kantronics KPC-3 Terminal Node Ctrlr
fmodem AMMOD
Kentrox 77030 CSU Minishelf (1, 2)
fdce AMDTE
Kentrox DataSMART T3 IDSU
frjKentrox annex-kentrox
Kentrox/ADC DataSMART Max (control DCE)
frjKentrox annex-kentrox
Kentrox/ADC DataSMART Max (control DTE)
frjKentrox annex-kentrox
King Star 2-Rack Unit PC
mdte92 AFDCE92
Knox Video Tech. Alpha-162 video matrix ctrl'r
fdce91 AMDTE91
KOAN Satellite Receiver
mdte91 AFDCE91
KRN Engineering Data Director Universal 'local'
fdce AMDTE
KTech DDR-150E
fdce91 AMDTE91
KTech Telecom DVM-100 VSB Ref. Receiver (HDTV)
fdce91 AMDTE91
KTech Telecom DVM-150E Digital TV Recv/Dec
fdce91 AMDTE91
KTech Telecom DVM-2000 Gig-E to NTSC
fdce91 AMDTE91
KTech Telecom VSB-FRQ-200 DV recv/decoder
fdce91 AMDTE91
Lantronix SecureLinx SLC16 console
frjCiscoC ciscoc-annex
Larsecom Access-T CRAFT and SUPV ports
mdte92 AFDCE92
Larsecom Access-T-45 CRAFT and SUPV ports
mdte92 AFDCE92
Larsecom Access-T1500 Rack CRAFT, SUPV
fdte AMDCE
Larsecom LE-551 PRI Interface
mdte92 AFDCE92
Larsecom Mega-T CRAFT and SUPV ports
mdte92 AFDCE92
Larsecom Orion 4500 CRAFT, SUPV, CIP
mdte92 AFDCE92
Larsecom Split-T FT1 Access MUX 'Supv'
mdte91 AFDCE91
LeeMah Datacom Sec. TraqNet 2004 'CONTROL TERMINAL'
mdce92 AFDTE92
Leitch 6800-Plus DVB distribution amp
mdte91 AFDCE91
Leitch FR6802+ 'serial'
mdte91 AFDCE91
Leitch Panacea RF/ASI matrix
mdte91 AFDCE91
Livingston PortMaster
mdte AFDCE
Logic Modeling LM-1000
fdce AMDTE
Logitech Transporter
fdce91 AMDTE91
Lucent AccessPoint 600 'AUX'
mdte92 AFDCE92
Lucent DDM-2000 CIT (fiber term.) console
mdte91 AFDCE91
Lucent PortMaster 3 'C0 - Diag' port
fdte AMDCE
Marconi ASX-200 BX Fiber Switch 'ser'
mdte92 AFDCE92
Marconi ESR Switch Router console
fdce92 AMDTE92
MHz Sub Alert EAS/CG 'serial 1'
mdte92 AFDCE92
MHz Sub Alert EAS/CG 'serial 2'
mdte92 AFDCE92
Micro Technology Lance Tap
mdte91 AFDCE91
Micron Millenia (PC, S1854-T-PIII800)
mdte92 AFDCE92
Middle Digital PC Weasel console redirector
mdte92 AFDCE92
MidStream VOD Server, SC Port
mdte92 AFDCE92
Mitel 3300 Controller Maint
fdce91 AMDTE91
Mitel 3300 Universal NSU Maint
fdce91 AMDTE91
Mitel SX-2000 Light J6, J7
fdce91 AMDTE91
Modulus Video AVC HE Encoder
mdce92 AFDTE92
Modulus Video ME2600
mdce92 AFDTE92
Monroe Electronics MIP-921E EAS System
fdce91 AMDTE91
Motorola BSR 1000
mdte91 AFDCE91
Motorola BSR 64000 SRM Terminal
mdte92 AFDCE92
Motorola ME2600
mdce92 AFDTE92
Motorola Quantar Control Module RSS
fdte92 AMDCE92
Motorola Spectra 'Accessory 3'
fdte AMDCE
Moxa N-Port (DE-311)
fdce92 AMDTE92
MRV Communications EM316NM card, NMS port
mdte92 AFDCE92
Multitech MT2834BA V.42 Modem
fmodem AMMOD
MVME 761-001 COM1 COM2
mdte91 AFDCE91
N2 Broadband GS-SR102 (Gigabyte Tech. Co., UK)
mdte92 AFDCE92
N2 Broadband MediaPath Catcher (1-RU), 3-bay
mdte92 AFDCE92
N2 Broadband MediaPath Catcher (2-RU), 6-bay
mdte92 AFDCE92
nCube n4 Stream Server (bottom jack)
mdte92 AFDCE92
nCube n4 Stream Server (top jack)
mdce91 AFDTE91
NDS Systems CSR820 commercial sat. receiver
fdce91 AMDTE91
NDS Systems Model 3000 DVB Digital Modulator
mdte91 AFDCE91
Net-App FAS 270 console
mdte91 AFDCE91
Net-App FAS 3020 console
frjCiscoC ciscoc-annex
Net-App NetApp F220, F230 CPU console
mdte92 AFDCE92
Net-App NetApp F330 CPU Console
mdte92 AFDCE92
Net-App NetApp F520, F540 CPU Console
mdte92 AFDCE92
Net-App NetApp F760 CPU Console
mdte92 AFDCE92
Net-App NetApp F840 CPU console
mdte92 AFDCE92
Net-App NetApp Fiber Shelf COM1, COM2
mdte91 AFDCE91
Net-App NetCache 1100
mdte92 AFDCE92
Net-App NetCache C1100
mdte92 AFDCE92
Net-App Serial Port Breakout
mdte92 AFDCE92
NetCom Systems SmartBits 2000 'rs-232' port
mdce AFDTE
Netopia Caymen 3500 series DSL router
fdce91 AMDTE91
NetScreen NetScreen-100
fdce AMDTE
NetScreen NetScreen-50
frjCiscoC ciscoc-annex
NetScreen NetScreen-5XP
fdce91 AMDTE91
Network Engines AdminEngine (PC) server
mdte92 AFDCE92
Network Engines Blazer (PC) server
mdte92 AFDCE92
Network Engines WebEngine (PC) server
mdte92 AFDCE92
Network Peripherals EIFO Client Server console
mdce91 AFDTE91
Network Peripherals NuSwitch FE-224C
fdce92 AMDTE92
NetWorth Series 2000 Snappable Hub
mdte91 AFDCE91
NetWorth Series 3000 'Serial Port'
mdte91 AFDCE91
NexGate NSA-1035 Pine App mail filter
mdte92 AFDCE92
Nexsan SAN Server
mdte92 AFDCE92
Nokia CC2500
frjCiscoC ciscoc-annex
Nokia IP 330 console
mdte92 AFDCE92
Nokia IP 350 console
mdte92 AFDCE92
Nokia IP 440 console
mdte92 AFDCE92
Nokia IP350, IP380, IP530 'Aux'
mdte92 AFDCE92
Nokia IP350, IP380, IP530 'Console'
mdte92 AFDCE92
Nokia IP 330 serial
mdte92 AFDCE92
Norpak NORPAK TES3. ports A, B, C
mdte92 AFDCE92
Norpak Norpak TTX74X (TX7-UNI-745) RS-232
fdce92 AMDTE92
Nortel Aspect 'J-11' 'RS-232'
fdce AMDTE
Nortel S/DMS Access Node 'User Port 1'
mdte92 AFDCE92
Nortel S/DMS Access Node 'User Port 2'
fdce AMDTE
Nortel S/DMS Transport Node 'U.I. Port 2'
fdce AMDTE
Nortel S/DMS Transport Node 'User Port 1'
mdte92 AFDCE92
Nortel Networks Metro 5200
fdte AMDCE
Nortel Networks Metro 5200 PPP port
fdce92 AMDTE92
Nortel Networks OPTera Metro 1200 ESM
mdce91 AFDTE91
Nortel Networks OPTera Metro 8691omSF 'console'
mdce92 AMDTE91
Nortel Networks Optical Ethernet OM33/34/35xx
fdce AMDTE
Nortel Networks Succession Univ. Audio Svr.
mdte92 AFDCE92
Northern Telecom FMT-150 O.C. fiber mux 'console'
mdte AFDCE
Northern Telecom NorStar FastRAD (modem)
fdce92 AMDTE92
NTCE CSU (model 1222026L7)
fdce91 AMDTE91
Octave Conf Bridge (PC)
mdte92 AFDCE92
Pace DSL4400NT Developer STB
fdce91 AMDTE91
Pace/NTL DITV-2000 STB
fdce91 AMDTE91
Packeteer 2500, 6500 Series
mdte92 AFDCE92
PacketStorm 1800E
mdte92 AFDCE92
PacketStorm 1800E
mdte92 AFDCE92
Palm Palm Vx cradle
fdce91 AMDTE91
Panaorama DTV RS232-1
fdce91 AMDTE91
Panaorama DTV RS232-2
fdce91 AMDTE91
Panasonic AG-5700 S-VHS Recorder
fdce AMDTE
Panasonic Hi-Def Plasma TH-42PHW5
fdce91 AMDTE91
Paradyne 4200 IP DSLAM
fdce92 AMDTE92
Paradyne 4800 BitStorm 'console'
mdce91 AFDTE91
Paradyne 4800 BitStorm 'modem'
fdte91 AMDCE91
PCs PC-AT serial ports
mdte92 AFDCE92
Philips DVS-3112 Video Encoder
fdte91 AMDCE91
Philips DVS-3200/1 TokenMux
fdte92 AMDCE92
Philips Integrated Program Decoder
fdte91 AMDCE91
Philips TRD-586 Tamper-Resistant Device
mdte92 AFDCE92
Plain Tree Systems Wave Switch 100 'PC Modem'
fdce91 AMDTE91
Plain Tree Systems Wave Switch 100 'test'
fdce91 AMDTE91
Polycom VSX8000
mdte91 AFDCE91
Quintech SRR 1000 series RF Switch
fdce91 AMDTE91
Rackable Systems Rackable with Roamer
frjMRV annex-xyplex
Raydyne DM-240 QAM Mod. RS-422
fdte91 AMDCE91
Raydyne DVB-3030 QPSK Mod. 'terminal'
fdte91 AMDCE91
Real Weasel PC Weasel
mdte92 AFDCE92
RedRack Intel-based 1-RU server
mdte92 AFDCE92
Relm MS-200 (200 ch, 12-band scanner)
fdce92 AMDTE92
Rhode & Schwarz Digital Video Quality Analyzer
mdte92 AFDCE92
Rhode & Schwarz DVQ (Dig. Video Qual. Anal)
mdte92 AFDCE92
Rhode & Schwarz MPEG-2 Stream Analyzer
mdte92 AFDCE92
Rhode & Schwarz Audio Analyzer COM1, COM 2
mdte92 AFDCE92
Riverbed Systems Steelhead
mdte92 AFDCE92
Riverstone RS8600 G8M-CM2 'Console'
mdce91 AFDTE91
Riverstone Networks RS-3000
mdce91 AFDTE91
Rockwell CM 2000B Modulator 'Rem Ctrl'
fdce92 AMDTE92
Ruby Technologies Gig-E Media Converter
mdte92 AFDCE92
SAGE EAS ENDEC 'Computer' port
mdte91 AFDCE91
SAGE EAS ENDEC, COM 2, 4-6
mdte91 AFDCE91
SAGE EAS ENDEC, COM 3
mdte92 AFDCE92
SAGE ENDEC Receiver, 'serial 2'
fdte91 AMDCE91
Sanmina Newsys (Intel MB)
mdte92 AFDCE92
Satellite Cruiser DSR-101 Plus
mdte91 AFDCE91
Savi Site Manager 'COM1', 'COM2'
mdte92 AFDCE92
Scientific Atlanta 8656X Scrambler 'RS-232'
fdce91 AMDTE91
Scientific Atlanta ASI-SONET (D9462)
fdce92 AMDTE92
Scientific Atlanta B.I.G. 'Aux Serial'
fdce92 AMDTE92
Scientific Atlanta B.I.G. msync ctrl 'craft'
fdce92 AMDTE92
Scientific Atlanta D9034-S Encoder RS232
fdce92 AMDTE92
Scientific Atlanta D9154 A.C.E. 'Async'
fdce91 AMDTE91
Scientific Atlanta D9154 A.C.E. 'Data'
fdte92 AMDCE92
Scientific Atlanta D9154 A.C.E.'Console'
fdte92 AMDCE92
Scientific Atlanta D9476 QAM 'ca sync'
fdce92 AMDTE92
Scientific Atlanta D9479-1 G-QAM Mod. 'craft'
fdce92 AMDTE92
Scientific Atlanta D9482 QPSK Mod. 'ca sync'
fdce92 AMDTE92
Scientific Atlanta D9492 QPSK Demod. 'diagnostic'
mdce91 AFDTE91
Scientific Atlanta DTH DVB set-top box 'data'
fdce91 AMDTE91
Scientific Atlanta Explorer 2000 'serial 1' port
fdce91 AMDTE91
Scientific Atlanta PowerVu Plus Adv. Encoder
mdte92 AFDCE92
Scientific Atlanta Prisma IP, 'VID PKT PROC' cons.
mdte91 AFDCE91
Scientific Atlanta Prisma IP, main DB-9 port
mdte91 AFDCE91
Scopus VID-2902 IP Decoder CONTROL
mdte91 AFDCE91
Scopus VID-2902 IP Decoder GPI/LS
mdte91 AFDCE91
SeaChange Int. Command Center
mdte92 AFDCE92
SeaChange Int. ITV Node
mdte92 AFDCE92
SeaChange Int. VS2000 Broadcast Cluster
mdte92 AFDCE92
Secure@ccess TRAQNET 2002 'Control Term'
mdce92 AFDTE92
Secure@ccess TRAQNET 2002 'Serial Prt'
mdce92 AFDTE92
Sencore MRD 3187A Rx/decoder
mdte92 AFDCE92
Sencore MSA MPEG Service Alnalyzer
mdte92 AFDCE92
Server Technology Sentry R-2000 power controller
fdce91 AMDTE91
SGI 1200 TTY ports
mdte92 AFDCE92
SGI 1400
mdte92 AFDCE92
SGI 1450
mdte92 AFDCE92
SGI Octane
mdte92 AFDCE92
Sharp XG-Vi0XU VGA projector
mdte91 AFDCE91
Shasta 5000 BSN Broadband RAS
frjCiscoC ciscoc-annex
Shiva VPN box; console, 'async0' ports
mdte92 AFDCE92
ShoreTel Conf Bridge (PC)
mdte92 AFDCE92
ShoreTel ShoreGear 120/24
fdce91 AMDTE91
ShoreTel ShoreGear 60/12
fdce91 AMDTE91
ShoreTel ShoreGear-24
fdce91 AMDTE91
Siemens Custom Callout Adapt 'PRINTER'
mdce92
Siemens Custom Callout Adapt 'TERMINAL'
fdce AMDTE
Siemens Custom Callout Adapter
fdce AMDTE
Siemens Nixdorf Phonemail SE (PC)
mdte92 AFDCE92
Siemens Nixdorf Primergy 700 (PC)
mdte92 AFDCE92
Siemens Nixdorf Primergy RX300 S2 (PC)
mdte92 AFDCE92
Siemens Nixdorf Pro D6 (PC)
mdte92 AFDCE92
Siemens Nixdorf Teleworking Server (PC)
mdte92 AFDCE92
Sierra video/audio Matrix Switch
fdte AMDCE
SiliconRacks PC rack chassis
mdte92 AFDCE92
Skystream IPLEX
mdte91 AFDCE91
Skystream SCM MediaPlex 20 console
mdte92 AFDCE92
Slim Devices Transporter
fdce91 AMDTE91
SMC Elite 3812TF
fdte91 AMDCE91
SMC TigerStack 3326TC
fdte91 AMDCE91
Snap Appliance SnapServer 4500 NAS
mdte92 AFDCE92
Sony DVW-A500 digital Beta editing deck
fdte AMDCE
Spectra Logic 64000 'COM' port
mdte92 AFDCE92
Spectra Logic 64000 'debug cable'
mdte92 AFDCE92
Spectra Logic Model 10,000 (Bullfrog)
mdce91 AFDTE91
Storage Experts Dynam. Network Factory 'modem'
mdte92 AFDCE92
Storage Experts Dynam. Network Factory 'monitor'
mdte91 AFDCE91
Storage Experts Dynam. Network Factory 'UPS'
mdce91 AFDTE91
StorageTek Timber Wolf 9730 library debug, cse
mdte92 AFDCE92
SUN Cobalt
mdte92 AFDCE92
Sun dual-port cables
fdte AMDCE
Sun Enterprise 220R TTY A, B
fdte AMDCE
Sun Enterprise 250 TTY A, B
fdte AMDCE
Sun Enterprise 4000, TTY A, B
fdte AMDCE
Sun Enterprise 450 TTY A+B
fdte AMDCE
Sun Enterprise 4500, Ultra 80
fdte AMDCE
Sun Netra 20 TTY A, B
fdte AMDCE
Sun Netra T-1 105
frjCiscoC ciscoc-annex
Sun Netra T-4, TTY A, TTY B
fdte AMDCE
Sun SPARC 10, TTY A, B
fdte AMDCE
Sun SPARC 2 TTY A, B
fdte AMDCE
Sun SPARC 20 TTY A, B
fdte AMDCE
Sun SPARC 5 TTY A only
fdte AMDCE
Sun StorEdge 3510
fdte92 AMDCE92
Sun SunFire 220R, TTY A, B
fdte AMDCE
Sun SunFire 280R (RSC card)
frjCiscoC ciscoc-annex
Sun SunFire 280R, TTY A, B
fdte AMDCE
Sun SunFire V100 mgmt
frjCiscoC ciscoc-annex
Sun SunFire V120 'A LOM', 'B SERIAL'
frjCiscoC ciscoc-annex
Sun SunFire V125 'A LOM', 'B SERIAL'
frjCiscoC ciscoc-annex
Sun SunFire V210 mgmt
frjCiscoC ciscoc-annex
Sun SunFire V210 TTY
mdte91 AFDCE91
Sun SunFire V2200 'A LOM', 'B SERIAL'
frjCiscoC ciscoc-annex
Sun SunFire V240
frjCiscoC ciscoc-annex
Sun SunFire V880
frjCiscoC ciscoc-annex
Sun SunFire X4100 'A LOM'
frjCiscoC ciscoc-annex
Sun SunFire X4500 'A LOM'
frjCiscoC ciscoc-annex
Sun Ultra 1 TTY A, B
fdte AMDCE
Sun Ultra 2 TTY A , B
fdte AMDCE
Sun Ultra 5 (TTY B only)
mdte92 AFDCE92
Sun Ultra 60 TTY A, B
fdte AMDCE
Sunrise Telecom AT2000RQ MPEG RF Analyzer
mdte92 AFDCE92
Super-Micro 1-Rack Unit PC COM1 and 2
mdte92 AFDCE92
Super-Micro SuperServer 6010L PC
mdte92 AFDCE92
Swan (integrator) PC-based UNIX host TTY port
mdte92 AFDCE92
Symplex Datamizer II 'BACK-UP'
mdte AFDCE
Symplex Datamizer II 'COMMAND'
mdce AFDTE
Symplex Datamizer II 'MODEM'
mdte AFDCE
Symplex Datamizer II ports A-D
fdce AMDTE
Synoptics LattisHub 2813 'RS-232'
mdte AFDCE
Synoptics LattisHub 2813 Service Port
fdce91 AMDTE91
Tandberg 708-OLT TVP Encoder
mdte91 AFDCE91
Tandberg EN5920 Encoder 'aux RS232'
mdte91 AFDCE91
Tandberg EN5920 Encoder 'data'
mdte91 AFDCE91
Tandberg EN5920 Encoder 'local control'
mdte91 AFDCE91
Tandberg Evolution 5000 (E5710 encoder)
fdce91 AMDTE91
Tandberg IPLEX
mdte91 AFDCE91
Tandberg MediaPath 'Catcher'
mdte92 AFDCE92
Tandberg TT-4010 Stream Probe
mdte92 AFDCE92
Tandberg TT-6020 modular chassis
fdte91 AMDCE91
Tandberg TT7116 IP Streamer 'IP out CBR'
mdte92 AFDCE92
Tandberg TT7116 IP Streamer 'MMI'
mdce92 AFDTE92
Tandberg TT-4030 Stream Analyer RS-232
mdte91 AFDCE91
Tandberg TT-4040 Stream Probe RS-232
mdte91 AFDCE91
TAPR AX.25 Packet TNC-2
fmodem AMMOD
Tektronix AD991 MPEG Streamer
mdte92 AFDCE92
Tektronix TG2000 Signal Gen., CPU RS-232
mdce92 AFDTE91
Telebit NetBlazer-PN, 'DTE a', 'DTE b'
fmodem AMMOD
Telebit Trail/Worldblazer modems
fmodem AMMOD
TeleMetrics CP-D-2A A/V control
mdte91 AFDCE91
TeleNet Server Sun Clone
fdte AMDCE
Tera Solutions TS-2305 RAID Server
mdce91 AFDTE91
Tera Solutions TSR-2200 RAID Shelf
mdce91 AFDTE91
Terayon CherryPicker 1000, 7000
mdte92 AFDCE92
Terayon CherryPicker Controller
mdte92 AFDCE92
Terayon DM 3200, DM 6400
mdte92 AFDCE92
Thayles Coral Video Server
mdte92 AFDCE92
Trilithic EASy-Plus Emerg. Alert System
mdte92 AFDCE92
Trilithic IPTV Emerg. Alert System
mdte92 AFDCE92
TrueTime NTS-200 net time svr
mdte91 AFDCE91
TrueTime NTS-200 Network Time Server
mdte91 AFDCE91
US Robotics Courier, Sportster modems
fmodem AMMOD
USBGear USBG-232s
mdte92 AFDCE92
V/A Linux 1000 Server (PC)
mdte92 AFDCE92
V/A Linux 1220 Server (PC)
mdte92 AFDCE92
V/A Linux 2240 Server (PC)
mdte92 AFDCE92
V/A Linux 501 Server, lower port
mdte92 AFDCE92
V/A Linux 501 Server, upper port
mdte92 AFDCE92
V/A Linux Full-On 2130 Server
mdte92 AFDCE92
V/A Linux Linux PC
mdte92 AFDCE92
Video Data Systems ENDECMCM port
mdte92 AFDCE92
Videotek DM-192 demodulator
mdce91 AFDTE91
Watts Up Watts Up Pro power monitor
fdce91 AMDTE91
WaveCom NSG8100 8-port MQAM
fdce91 AMDTE91
WaveCom UCM 4540 Modulator
frjCiscoC ciscoc-annex
Wavetek Model 395 Waveform Generator; RS-232
fdce91 AMDTE91
Web-TV Mercury-DVT
mdte91 AFDCE91
Wegener Comm. Unity 4422 MPEG-2 IRD
fdce91 AMDTE91
Western Telematic SRM-100 Secure Modem - console
mdte91 AFDCE91
Western Telematic SRM-100 Secure Modem - modem
fmodem AMMOD
WIN Communications 440CT PBX console
mdce92 AFDTE92
WIN Communications 440CT PBX Local Maint
fdce AMDTE
WIN Communications 440CT PBX SMDR Out
fdce AMDTE
Wyse WY-55 CRT/Terminal 'AUX' port
fdce AMDTE
Wyse WY-55 CRT/Terminal 'MODEM' port
mdte AFDCE
XYLAN OmniSwitch (MPM 1G card) 'Console'
fdce91 AMDTE91
XYLAN OmniSwitch (MPM 1G card) 'Modem'
mdte91 AFDCE91
Yago (Cabletron) MSR-800 (Smart Switch Router)
mdce92 AFDTE91
Zzyzx Peripherals Gadzooks Capelix FC-AL SAN Sw.
mdte91 AFDCE91
Zzyzx Peripherals Rocket Store 2000
mdte91 AFDCE91
-----

This file should be available from the Conserver.com web site. Look for a link on the bottom of the Annex Adapters web page.

When connecting a listed device to a terminal server, use the listed adapter.

If you are trying to connect two listed devices together, use the listed adapter for the *first* device, and then use the *opposite* version of the listed adapter for the second device. (That is, if a DCE adapter is listed, use the DTE version instead, but only use this 'opposite adapter' on one of the devices, but not both devices.)

If you have any comments or corrections, please send email to "consoles" at "conserver.com".

This document was generated using PERL (with help from Emmett Hogan), with the text-to-PalmDoc translation done using bibelot.pl, by John Fulmer, and currently available from sourceforge.net (search for the project named bibelot.)

Copyright 2001-2008,
David K. Z. Harris.

-eof-